\hypertarget{interfacefuncphys_1_1fpvsi}{}\doxysubsection{funcphys\+::fpvsi Interface Reference}
\label{interfacefuncphys_1_1fpvsi}\index{funcphys::fpvsi@{funcphys::fpvsi}}


Collaboration diagram for funcphys\+::fpvsi\+:\nopagebreak
\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=162pt]{interfacefuncphys_1_1fpvsi__coll__graph}
\end{center}
\end{figure}
\doxysubsubsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
elemental real(r4) function \mbox{\hyperlink{interfacefuncphys_1_1fpvsi_af30a283321fc9a19dcd4f9a1b1b6bca2_af30a283321fc9a19dcd4f9a1b1b6bca2}{fpvsi\+\_\+r4}} (t)
\begin{DoxyCompactList}\small\item\em This function computes saturation vapor pressure from the temperature. A linear interpolation is done between values in a lookup table computed in \mbox{\hyperlink{namespacefuncphys_a809a019f399afbdbd12524d32977e91f_a809a019f399afbdbd12524d32977e91f}{gpvsi()}}. See documentation for \mbox{\hyperlink{namespacefuncphys_af6aaccab2f7a5a64daf96ee656d2f2f7_af6aaccab2f7a5a64daf96ee656d2f2f7}{fpvsix()}} for details. Input values outside table range are reset to table extrema. \end{DoxyCompactList}\item 
elemental real(r8) function \mbox{\hyperlink{interfacefuncphys_1_1fpvsi_ace853448373bfc0d0e735f3ef17ead3c_ace853448373bfc0d0e735f3ef17ead3c}{fpvsi\+\_\+r8}} (t)
\end{DoxyCompactItemize}


\doxysubsubsection{Member Function/\+Subroutine Documentation}
\mbox{\Hypertarget{interfacefuncphys_1_1fpvsi_af30a283321fc9a19dcd4f9a1b1b6bca2_af30a283321fc9a19dcd4f9a1b1b6bca2}\label{interfacefuncphys_1_1fpvsi_af30a283321fc9a19dcd4f9a1b1b6bca2_af30a283321fc9a19dcd4f9a1b1b6bca2}} 
\index{funcphys::fpvsi@{funcphys::fpvsi}!fpvsi\_r4@{fpvsi\_r4}}
\index{fpvsi\_r4@{fpvsi\_r4}!funcphys::fpvsi@{funcphys::fpvsi}}
\doxyparagraph{\texorpdfstring{fpvsi\_r4()}{fpvsi\_r4()}}
{\footnotesize\ttfamily elemental real(r4) function funcphys\+::fpvsi\+::fpvsi\+\_\+r4 (\begin{DoxyParamCaption}\item[{real(r4), intent(in)}]{t }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [private]}}

\begin{DoxyAuthor}{Author}
N Phillips 
\end{DoxyAuthor}
\mbox{\Hypertarget{interfacefuncphys_1_1fpvsi_ace853448373bfc0d0e735f3ef17ead3c_ace853448373bfc0d0e735f3ef17ead3c}\label{interfacefuncphys_1_1fpvsi_ace853448373bfc0d0e735f3ef17ead3c_ace853448373bfc0d0e735f3ef17ead3c}} 
\index{funcphys::fpvsi@{funcphys::fpvsi}!fpvsi\_r8@{fpvsi\_r8}}
\index{fpvsi\_r8@{fpvsi\_r8}!funcphys::fpvsi@{funcphys::fpvsi}}
\doxyparagraph{\texorpdfstring{fpvsi\_r8()}{fpvsi\_r8()}}
{\footnotesize\ttfamily elemental real(r8) function funcphys\+::fpvsi\+::fpvsi\+\_\+r8 (\begin{DoxyParamCaption}\item[{real(r8), intent(in)}]{t }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [private]}}

