\hypertarget{namespacephys__tend}{}\doxysubsection{phys\+\_\+tend Module Reference}
\label{namespacephys__tend}\index{phys\_tend@{phys\_tend}}
\doxysubsubsection*{Functions/\+Subroutines}
\begin{DoxyCompactItemize}
\item 
subroutine, public \mbox{\hyperlink{namespacephys__tend_ad4a873b24920be429af745eaf137a6b2_ad4a873b24920be429af745eaf137a6b2}{phys\+\_\+tend\+\_\+run}} (ldiag3d, dtend, dtidx, ntracp100, index\+\_\+of\+\_\+process\+\_\+physics, index\+\_\+of\+\_\+process\+\_\+photochem, nprocess, nprocess\+\_\+summed, is\+\_\+photochem, ntoz, errmsg, errflg)
\end{DoxyCompactItemize}


\doxysubsubsection{Function/\+Subroutine Documentation}
\mbox{\Hypertarget{namespacephys__tend_ad4a873b24920be429af745eaf137a6b2_ad4a873b24920be429af745eaf137a6b2}\label{namespacephys__tend_ad4a873b24920be429af745eaf137a6b2_ad4a873b24920be429af745eaf137a6b2}} 
\index{phys\_tend@{phys\_tend}!phys\_tend\_run@{phys\_tend\_run}}
\index{phys\_tend\_run@{phys\_tend\_run}!phys\_tend@{phys\_tend}}
\doxyparagraph{\texorpdfstring{phys\_tend\_run()}{phys\_tend\_run()}}
{\footnotesize\ttfamily subroutine, public phys\+\_\+tend\+::phys\+\_\+tend\+\_\+run (\begin{DoxyParamCaption}\item[{logical, intent(in)}]{ldiag3d,  }\item[{real(kind=kind\+\_\+phys), dimension(\+:,\+:,\+:), intent(inout), optional}]{dtend,  }\item[{integer, dimension(\+:,\+:), intent(in)}]{dtidx,  }\item[{integer, intent(in)}]{ntracp100,  }\item[{integer, intent(in)}]{index\+\_\+of\+\_\+process\+\_\+physics,  }\item[{integer, intent(in)}]{index\+\_\+of\+\_\+process\+\_\+photochem,  }\item[{integer, intent(in)}]{nprocess,  }\item[{integer, intent(in)}]{nprocess\+\_\+summed,  }\item[{logical, dimension(\+:), intent(in)}]{is\+\_\+photochem,  }\item[{integer, intent(in)}]{ntoz,  }\item[{character(len=$\ast$), intent(out)}]{errmsg,  }\item[{integer, intent(out)}]{errflg }\end{DoxyParamCaption})}

\hypertarget{namespacephys__tend_ad4a873b24920be429af745eaf137a6b2_arg_table_phys_tend_run}{}\doxysubsubsection{Argument Table}\label{namespacephys__tend_ad4a873b24920be429af745eaf137a6b2_arg_table_phys_tend_run}
 